CR32-1201-FL ASJ Resistor 1.2K Ohm 1% 0.25W SMD 1206

CR32-1201-FL ASJ Resistor 1.2KOhm 1% 0.25W SMD 1206
Part #: CR32-1201-FL
Description chip resistor 1206 1% 1.2KOhm 0.25W
Manufacturer ASJ
Resistance 1.2 kOhm
Size 1206
Tolerance 1%
Power, W] 0.25
TTC [ppm /?] – / + 100
Operating voltage [V] 200
Temperature range [C] -55 … + 155C
Technology Thick Film
Manufacturer packaging [pcs] 5000
Type of packaging Coil / cardboard
Application AEC-Q (200)
RoHS Compliance RoHS

Manufacturer Part Number: CR32-1201-FL

Manufacturer: ASJ Components

Datasheet: ASJ_General_Thick_Film_Chip_Resistor.pdf